SEPbusy_table.txt Wed Jun 22 15:22:49 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.2060     134.8982     mm/d    precip large scale rain
        pr       0.0000       3.4333     134.8982     mm/d    total precipitation
   evspsbl     -15.5128      -3.4096       4.1513     mm/d    evaporation
       P_E     -13.8943       0.0237     131.1624     mm/d    precipitation-evaporation
       sic       0.0000       3.8108      99.9993        %    ice cover (fraction of grid box)
      hfss    -598.7493     -17.6239     423.2407     W/m2    sensible heat flux
      hfls    -449.0091     -98.7176     120.1557     W/m2    latent heat flux
       prw       0.1148      29.0061      69.1306    kg/m2    vertically integrated water vapor
     cllvi       0.0000      79.1506    1252.9193     g/m2    vertically integrated cloud water
     clivi       0.0000      11.9519     166.7064     g/m2    vertically integrated cloud ice
       psl     -36.3336      11.0280      29.3063      hPa    mean sea level pressure
       clt       0.0000      59.7627     100.0000        %    total cloud cover
        ts     -74.6586      16.6684      42.7257        C    surface temperature
       tas     -67.9193      16.0862      40.1814        C    2 m temperature
      rsns       1.2027     169.2518     288.3574     W/m2    net surface SW radiation
      rsds       5.8082     193.8961     327.4828     W/m2    SW down surface
      rsus       1.3505      24.6442     249.7471     W/m2    SW up  surface
      rlns    -150.7734     -52.0617       2.5531     W/m2    net surface LW radiation
      rlds      61.7339     354.9076     472.0433     W/m2    LW down surface
      rlus      88.1363     406.9693     565.9751     W/m2    LW up surface
  net_flux    -863.7469       0.8486     421.6679     W/m2    surface net energy flux
      rsnt       3.2483     247.4769     383.3992     W/m2    net top SW radiation
      rlnt    -337.5020    -244.1803     -95.2597     W/m2    net top LW radiation  (-OLR)
      rsdt      10.9002     336.5973     428.4933     W/m2    top incoming SW radiation
      rsut       7.5902      89.1204     259.8115     W/m2    TOA Outgoing SW Radiation
     sclf0    -201.0321     -38.1086       0.0728     W/m2    TOA net SW cloud effect
      tauu   -4454.2251      12.4452   12114.1562    mN/m2    u-stress
      tauv   -4890.3276       8.6688    3742.8379    mN/m2    v-stress
   sfcwind       0.2163       6.6486      24.5261      m/s    10m Wind Speed
       sit       0.0000       0.0437      10.9743        m    ice thickness
      qgvi       0.0000       0.0126       0.4267    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0231       0.6994    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0780       1.1766    kg/m2    total_snow  vertically integrated s