OCTbusy_table.txt Wed Jun 22 15:31:17 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0979      80.6450     mm/d    precip large scale rain
        pr       0.0000       3.3512      80.6450     mm/d    total precipitation
   evspsbl     -17.2145      -3.3023       1.3184     mm/d    evaporation
       P_E     -14.0577       0.0490      77.8216     mm/d    precipitation-evaporation
       sic       0.0000       4.0228      99.9982        %    ice cover (fraction of grid box)
      hfss    -355.8899     -16.3078     241.7844     W/m2    sensible heat flux
      hfls    -498.2655     -95.6499      43.2534     W/m2    latent heat flux
       prw       0.1578      27.7507      63.1456    kg/m2    vertically integrated water vapor
     cllvi       0.0000      76.9088     961.4800     g/m2    vertically integrated cloud water
     clivi       0.0000      11.9272     214.5280     g/m2    vertically integrated cloud ice
       psl     -40.8694      11.1629      34.1464      hPa    mean sea level pressure
       clt       0.0000      60.1761     100.0000        %    total cloud cover
        ts     -63.8953      15.8145      38.0870        C    surface temperature
       tas     -59.9566      15.1850      36.0478        C    2 m temperature
      rsns       0.0000     171.5648     308.1081     W/m2    net surface SW radiation
      rsds       0.0000     200.1887     382.8027     W/m2    SW down surface
      rsus       0.0000      28.6239     249.1188     W/m2    SW up  surface
      rlns    -160.8068     -52.6165      -2.8381     W/m2    net surface LW radiation
      rlds      67.5406     349.2377     450.6707     W/m2    LW down surface
      rlus     109.0575     401.8542     534.7086     W/m2    LW up surface
  net_flux    -583.2933       6.9906     255.1627     W/m2    surface net energy flux
      rsnt       0.0000     249.1718     396.1305     W/m2    net top SW radiation
      rlnt    -324.7128    -242.4937    -111.5114     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     342.3935     443.7526     W/m2    top incoming SW radiation
      rsut       0.0000      93.2216     266.2697     W/m2    TOA Outgoing SW Radiation
     sclf0    -187.2388     -38.0611       0.3390     W/m2    TOA net SW cloud effect
      tauu   -2225.2004      14.2926    6929.5547    mN/m2    u-stress
      tauv   -4086.9246       2.8289    4094.3828    mN/m2    v-stress
   sfcwind       0.2036       6.5276      20.2704      m/s    10m Wind Speed
       sit       0.0000       0.0476      11.1648        m    ice thickness
      qgvi       0.0000       0.0125       0.3328    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0221       0.4312    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0772       1.2409    kg/m2    total_snow  vertically integrated s