OCTbusy_table.txt Wed Jun 22 11:55:25 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0526      84.2195     mm/d    precip large scale rain
        pr       0.0000       3.3117      84.2195     mm/d    total precipitation
   evspsbl     -15.8603      -3.2671       1.0639     mm/d    evaporation
       P_E     -13.8385       0.0446      81.2796     mm/d    precipitation-evaporation
       sic       0.0000       3.6860      99.9994        %    ice cover (fraction of grid box)
      hfss    -355.9298     -16.2311     259.0391     W/m2    sensible heat flux
      hfls    -459.0662     -94.6251      34.9032     W/m2    latent heat flux
       prw       0.1167      27.3260      64.3054    kg/m2    vertically integrated water vapor
     cllvi       0.0000      77.9024    1009.6985     g/m2    vertically integrated cloud water
     clivi       0.0000      11.6595     229.9289     g/m2    vertically integrated cloud ice
       psl     -35.1196      11.1587      30.6003      hPa    mean sea level pressure
       clt       0.0000      59.7994     100.0000        %    total cloud cover
        ts     -66.8357      15.8190      38.2863        C    surface temperature
       tas     -63.5579      15.1781      37.0912        C    2 m temperature
      rsns       0.0000     171.6117     305.8122     W/m2    net surface SW radiation
      rsds       0.0000     199.9526     383.7925     W/m2    SW down surface
      rsus       0.0000      28.3410     262.6827     W/m2    SW up  surface
      rlns    -161.6610     -53.1136      -3.2486     W/m2    net surface LW radiation
      rlds      61.4369     348.5551     449.6529     W/m2    LW down surface
      rlus     103.3316     401.6687     534.8304     W/m2    LW up surface
  net_flux    -493.5529       7.6419     253.6693     W/m2    surface net energy flux
      rsnt       0.0000     249.0572     396.7604     W/m2    net top SW radiation
      rlnt    -324.3181    -243.2309    -106.4057     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     342.3935     443.7526     W/m2    top incoming SW radiation
      rsut       0.0000      93.3363     265.6985     W/m2    TOA Outgoing SW Radiation
     sclf0    -183.2280     -38.4491       0.4161     W/m2    TOA net SW cloud effect
      tauu   -2261.0662      14.6105    9387.4062    mN/m2    u-stress
      tauv   -3588.2913       5.9828    3830.4741    mN/m2    v-stress
   sfcwind       0.1942       6.4804      20.9333      m/s    10m Wind Speed
       sit       0.0000       0.0410      11.1880        m    ice thickness
      qgvi       0.0000       0.0123       0.3148    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0216       0.4238    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0766       1.2139    kg/m2    total_snow  vertically integrated s