NOVbusy_table.txt Wed Jun 22 15:35:11 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0982      84.6691     mm/d    precip large scale rain
        pr       0.0000       3.3885      84.6691     mm/d    total precipitation
   evspsbl     -20.8699      -3.3696       1.3585     mm/d    evaporation
       P_E     -19.6070       0.0189      81.5291     mm/d    precipitation-evaporation
       sic       0.0000       4.3126      99.9994        %    ice cover (fraction of grid box)
      hfss    -368.9702     -14.9854     374.3654     W/m2    sensible heat flux
      hfls    -604.0665     -97.6423      44.2179     W/m2    latent heat flux
       prw       0.2676      26.6571      63.4814    kg/m2    vertically integrated water vapor
     cllvi       0.0000      78.6741     817.5718     g/m2    vertically integrated cloud water
     clivi       0.0000      12.3320     239.6331     g/m2    vertically integrated cloud ice
       psl     -32.1699      11.3759      33.4247      hPa    mean sea level pressure
       clt       0.0000      61.5145     100.0000        %    total cloud cover
        ts     -47.3968      14.7204      39.6634        C    surface temperature
       tas     -45.7976      14.0949      35.2603        C    2 m temperature
      rsns       0.0000     170.6481     335.6401     W/m2    net surface SW radiation
      rsds       0.0000     202.6222     426.8647     W/m2    SW down surface
      rsus       0.0000      31.9741     298.2802     W/m2    SW up  surface
      rlns    -160.9843     -52.4224      -0.8849     W/m2    net surface LW radiation
      rlds      84.1276     343.4841     444.7373     W/m2    LW down surface
      rlus     147.3139     395.9064     545.8049     W/m2    LW up surface
  net_flux    -833.5795       5.5981     390.1871     W/m2    surface net energy flux
      rsnt       0.0000     248.3742     424.4446     W/m2    net top SW radiation
      rlnt    -315.5201    -240.2399    -140.4346     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     347.7691     481.4131     W/m2    top incoming SW radiation
      rsut       0.0000      99.3949     318.0040     W/m2    TOA Outgoing SW Radiation
     sclf0    -173.4729     -40.4461       0.0105     W/m2    TOA net SW cloud effect
      tauu   -3679.2354      15.9877    9786.4688    mN/m2    u-stress
      tauv   -4133.3657      -0.6736    4202.8818    mN/m2    v-stress
   sfcwind       0.1554       6.5615      22.4388      m/s    10m Wind Speed
       sit       0.0000       0.0523      11.8823        m    ice thickness
      qgvi       0.0000       0.0125       0.3447    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0222       0.4722    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0792       1.2082    kg/m2    total_snow  vertically integrated s