MAYbusy_table.txt Wed Jun 22 12:50:28 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.2123      84.9952     mm/d    precip large scale rain
        pr       0.0000       3.4284      84.9952     mm/d    total precipitation
   evspsbl     -15.5967      -3.4546       2.5368     mm/d    evaporation
       P_E     -14.9188      -0.0261      79.0530     mm/d    precipitation-evaporation
       sic       0.0000       3.9732     100.0000        %    ice cover (fraction of grid box)
      hfss    -517.1318     -19.5716     297.3324     W/m2    sensible heat flux
      hfls    -451.4393    -100.0728      73.4249     W/m2    latent heat flux
       prw       0.1933      27.8398      63.2130    kg/m2    vertically integrated water vapor
     cllvi       0.0000      75.7579     877.4450     g/m2    vertically integrated cloud water
     clivi       0.0000      12.5048     105.4707     g/m2    vertically integrated cloud ice
       psl     -31.1472      11.0289      28.6101      hPa    mean sea level pressure
       clt       0.0000      61.0128     100.0000        %    total cloud cover
        ts     -70.6054      16.6867      43.6976        C    surface temperature
       tas     -64.8113      16.0342      43.4328        C    2 m temperature
      rsns       0.0000     166.2334     325.9386     W/m2    net surface SW radiation
      rsds       0.0000     193.9197     398.0707     W/m2    SW down surface
      rsus       0.0000      27.6863     318.8049     W/m2    SW up  surface
      rlns    -157.4943     -52.9218       1.8354     W/m2    net surface LW radiation
      rlds      71.1091     353.4803     460.5240     W/m2    LW down surface
      rlus      95.4192     406.4020     571.9778     W/m2    LW up surface
  net_flux    -819.3555      -6.3328     379.9661     W/m2    surface net energy flux
      rsnt       0.0000     243.2204     410.5505     W/m2    net top SW radiation
      rlnt    -336.5173    -242.4884    -103.7173     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     332.7651     462.6716     W/m2    top incoming SW radiation
      rsut       0.0000      89.5446     304.4188     W/m2    TOA Outgoing SW Radiation
     sclf0    -198.8546     -36.0402       4.6499     W/m2    TOA net SW cloud effect
      tauu   -7807.9282      16.2867    7985.2461    mN/m2    u-stress
      tauv   -3820.5930       6.7261    3424.6567    mN/m2    v-stress
   sfcwind       0.2001       6.3878      22.8163      m/s    10m Wind Speed
       sit       0.0000       0.0642      11.1515        m    ice thickness
      qgvi       0.0000       0.0135       0.4556    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0226       0.6502    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0811       1.1499    kg/m2    total_snow  vertically integrated s