MARbusy_table.txt Wed Jun 22 12:43:00 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0007      66.8615     mm/d    precip large scale rain
        pr       0.0000       3.3046      75.1810     mm/d    total precipitation
   evspsbl     -15.2377      -3.3312       1.6895     mm/d    evaporation
       P_E     -13.0804      -0.0266      75.4336     mm/d    precipitation-evaporation
       sic       0.0000       3.0011     100.0000        %    ice cover (fraction of grid box)
      hfss    -405.2100     -17.4061     465.4731     W/m2    sensible heat flux
      hfls    -441.0459     -96.5552      55.0570     W/m2    latent heat flux
       prw       0.3444      26.9105      60.0103    kg/m2    vertically integrated water vapor
     cllvi       0.0000      73.3207     741.2600     g/m2    vertically integrated cloud water
     clivi       0.0000      12.4920     301.9687     g/m2    vertically integrated cloud ice
       psl     -24.6816      11.4070      32.7007      hPa    mean sea level pressure
       clt       0.0672      60.8433     100.0000        %    total cloud cover
        ts     -57.7082      14.9733      37.8082        C    surface temperature
       tas     -52.8123      14.2812      36.7385        C    2 m temperature
      rsns       1.5012     174.0782     296.1330     W/m2    net surface SW radiation
      rsds       9.3324     201.0901     342.0323     W/m2    SW down surface
      rsus       1.5813      27.0119     233.4734     W/m2    SW up  surface
      rlns    -139.7497     -53.3257       2.3753     W/m2    net surface LW radiation
      rlds      87.9324     344.6457     442.0807     W/m2    LW down surface
      rlus     122.1326     397.9714     532.8320     W/m2    LW up surface
  net_flux    -659.2129       6.7913     346.1633     W/m2    surface net energy flux
      rsnt       7.8259     252.0495     392.4540     W/m2    net top SW radiation
      rlnt    -319.6321    -239.8704    -131.8060     W/m2    net top LW radiation  (-OLR)
      rsdt      21.1779     343.6619     437.0393     W/m2    top incoming SW radiation
      rsut      13.1053      91.6123     270.3456     W/m2    TOA Outgoing SW Radiation
     sclf0    -211.2048     -37.9362       3.9822     W/m2    TOA net SW cloud effect
      tauu   -3112.1160      13.1501   10736.0645    mN/m2    u-stress
      tauv   -4240.9102       0.5509    2693.0586    mN/m2    v-stress
   sfcwind       0.2457       6.2991      24.6994      m/s    10m Wind Speed
       sit       0.0000       0.0531      10.9528        m    ice thickness
      qgvi       0.0000       0.0136       0.3276    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0214       0.4545    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0793       1.2547    kg/m2    total_snow  vertically integrated s