MARbusy_table.txt Wed Jun 22 11:12:28 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0754      82.6756     mm/d    precip large scale rain
        pr       0.0000       3.3393      82.6756     mm/d    total precipitation
   evspsbl     -20.6018      -3.3479       4.7803     mm/d    evaporation
       P_E     -16.0772      -0.0086      77.8119     mm/d    precipitation-evaporation
       sic       0.0000       2.6455     100.0000        %    ice cover (fraction of grid box)
      hfss    -386.0742     -16.9597     531.2201     W/m2    sensible heat flux
      hfls    -596.3084     -97.0390     156.0944     W/m2    latent heat flux
       prw       0.2458      26.7075      62.1064    kg/m2    vertically integrated water vapor
     cllvi       0.0000      74.2981     782.8822     g/m2    vertically integrated cloud water
     clivi       0.0000      12.5935     271.1920     g/m2    vertically integrated cloud ice
       psl     -20.7773      11.4332      35.9598      hPa    mean sea level pressure
       clt       0.2016      61.3563     100.0000        %    total cloud cover
        ts     -59.6003      14.6889      38.1531        C    surface temperature
       tas     -55.9668      14.0534      35.5615        C    2 m temperature
      rsns       1.3085     173.6557     292.6471     W/m2    net surface SW radiation
      rsds       8.4081     200.8721     348.0790     W/m2    SW down surface
      rsus       1.7441      27.2164     241.3776     W/m2    SW up  surface
      rlns    -149.2529     -53.0705       6.0978     W/m2    net surface LW radiation
      rlds      79.1436     343.5638     444.9305     W/m2    LW down surface
      rlus     118.0257     396.6343     535.5399     W/m2    LW up surface
  net_flux    -769.7467       6.5865     555.9213     W/m2    surface net energy flux
      rsnt       7.5186     251.4823     392.2322     W/m2    net top SW radiation
      rlnt    -317.2626    -239.6007    -128.4971     W/m2    net top LW radiation  (-OLR)
      rsdt      21.1779     343.6619     437.0393     W/m2    top incoming SW radiation
      rsut      13.5101      92.1796     266.6542     W/m2    TOA Outgoing SW Radiation
     sclf0    -201.7406     -38.4180       3.4330     W/m2    TOA net SW cloud effect
      tauu   -3027.2415       9.0961    8693.6494    mN/m2    u-stress
      tauv   -4369.4697      -2.5121    3162.8501    mN/m2    v-stress
   sfcwind       0.2136       6.3515      20.8527      m/s    10m Wind Speed
       sit       0.0000       0.0451      11.1988        m    ice thickness
      qgvi       0.0000       0.0129       0.2673    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0215       0.5022    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0798       1.1884    kg/m2    total_snow  vertically integrated s