JUNbusy_table.txt Wed Jun 22 12:53:56 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.3233     114.6811     mm/d    precip large scale rain
        pr       0.0000       3.5049     114.6811     mm/d    total precipitation
   evspsbl     -16.1649      -3.5554       8.8170     mm/d    evaporation
       P_E     -16.1649      -0.0505     109.5273     mm/d    precipitation-evaporation
       sic       0.0000       4.1352      99.9995        %    ice cover (fraction of grid box)
      hfss    -414.0190     -19.7750     289.6644     W/m2    sensible heat flux
      hfls    -467.8845    -102.9421     255.2026     W/m2    latent heat flux
       prw       0.2146      28.9787      72.8799    kg/m2    vertically integrated water vapor
     cllvi       0.0000      81.2690    1264.4059     g/m2    vertically integrated cloud water
     clivi       0.0000      12.0048     214.2433     g/m2    vertically integrated cloud ice
       psl     -21.2382      10.9287      29.3073      hPa    mean sea level pressure
       clt       0.0000      60.5082     100.0000        %    total cloud cover
        ts     -68.6596      17.3424      44.9883        C    surface temperature
       tas     -63.3302      16.7225      42.3278        C    2 m temperature
      rsns       0.0000     162.5947     328.3979     W/m2    net surface SW radiation
      rsds       0.0000     188.1708     413.1420     W/m2    SW down surface
      rsus       0.0000      25.5762     325.5251     W/m2    SW up  surface
      rlns    -160.4344     -52.0155      16.5766     W/m2    net surface LW radiation
      rlds      77.6686     357.8043     481.9002     W/m2    LW down surface
      rlus      99.2974     409.8198     582.6706     W/m2    LW up surface
  net_flux    -704.1576     -12.1378     639.6990     W/m2    surface net energy flux
      rsnt       0.0000     240.9090     424.8513     W/m2    net top SW radiation
      rlnt    -352.2611    -244.7753    -107.0517     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     329.7388     517.3927     W/m2    top incoming SW radiation
      rsut       0.0000      88.8298     338.3813     W/m2    TOA Outgoing SW Radiation
     sclf0    -223.1188     -37.3267       0.1913     W/m2    TOA net SW cloud effect
      tauu   -5301.3135       9.2739    7192.4634    mN/m2    u-stress
      tauv   -4260.0522      11.7647    3818.7473    mN/m2    v-stress
   sfcwind       0.2236       6.4118      23.2629      m/s    10m Wind Speed
       sit       0.0000       0.0593      11.2550        m    ice thickness
      qgvi       0.0000       0.0137       0.5077    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0234       0.8389    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0806       1.3192    kg/m2    total_snow  vertically integrated s