AUGbusy_table.txt Wed Jun 22 13:01:43 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.2092      70.0259     mm/d    precip large scale rain
        pr       0.0000       3.4004      70.0259     mm/d    total precipitation
   evspsbl     -16.3982      -3.3461       7.9756     mm/d    evaporation
       P_E     -16.3982       0.0544      64.6713     mm/d    precipitation-evaporation
       sic       0.0000       3.9134      99.9994        %    ice cover (fraction of grid box)
      hfss    -562.8322     -18.3896     225.8377     W/m2    sensible heat flux
      hfls    -474.6375     -96.8664     230.8490     W/m2    latent heat flux
       prw       0.1237      30.0571      76.6074    kg/m2    vertically integrated water vapor
     cllvi       0.0000      81.7642    1069.0240     g/m2    vertically integrated cloud water
     clivi       0.0000      11.4049     369.9603     g/m2    vertically integrated cloud ice
       psl     -28.5831      10.9028      28.6399      hPa    mean sea level pressure
       clt       0.0000      59.4248     100.0000        %    total cloud cover
        ts     -75.9554      17.3276      46.6489        C    surface temperature
       tas     -69.5086      16.7440      43.4686        C    2 m temperature
      rsns       0.0000     165.8048     292.0812     W/m2    net surface SW radiation
      rsds       0.0000     188.9354     359.5769     W/m2    SW down surface
      rsus       0.0000      23.1306     249.5096     W/m2    SW up  surface
      rlns    -154.3268     -51.8342      27.2680     W/m2    net surface LW radiation
      rlds      62.4748     358.6770     482.8428     W/m2    LW down surface
      rlus      85.7389     410.5112     594.4953     W/m2    LW up surface
  net_flux    -911.0809      -1.2853     632.5197     W/m2    surface net energy flux
      rsnt       0.0000     244.7861     392.5979     W/m2    net top SW radiation
      rlnt    -350.3232    -245.8746     -94.8975     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     331.9143     440.1257     W/m2    top incoming SW radiation
      rsut       0.0000      87.1283     270.6150     W/m2    TOA Outgoing SW Radiation
     sclf0    -203.7088     -37.7059       0.0000     W/m2    TOA net SW cloud effect
      tauu   -6608.0767      15.7319    7294.9380    mN/m2    u-stress
      tauv   -3569.7222      12.9609    2729.2310    mN/m2    v-stress
   sfcwind       0.2250       6.4527      25.7041      m/s    10m Wind Speed
       sit       0.0000       0.0426      11.1980        m    ice thickness
      qgvi       0.0000       0.0126       0.4774    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0231       0.4609    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0760       1.4905    kg/m2    total_snow  vertically integrated s