AUGbusy_table.txt Wed Jun 22 11:37:13 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.3062      75.0752     mm/d    precip large scale rain
        pr       0.0000       3.4952      83.7791     mm/d    total precipitation
   evspsbl     -17.3484      -3.4725       7.8827     mm/d    evaporation
       P_E     -16.0289       0.0227      84.1201     mm/d    precipitation-evaporation
       sic       0.0000       3.6183     100.0000        %    ice cover (fraction of grid box)
      hfss    -604.4571     -17.2983     325.7008     W/m2    sensible heat flux
      hfls    -502.1402    -100.5247     228.1598     W/m2    latent heat flux
       prw       0.1220      30.7664      72.7674    kg/m2    vertically integrated water vapor
     cllvi       0.0000      87.0032    1036.5117     g/m2    vertically integrated cloud water
     clivi       0.0000      11.7438     223.4262     g/m2    vertically integrated cloud ice
       psl     -33.8199      10.8805      30.1816      hPa    mean sea level pressure
       clt       0.0000      60.4389     100.0000        %    total cloud cover
        ts     -78.2573      17.2856      46.0452        C    surface temperature
       tas     -72.6919      16.7341      42.9700        C    2 m temperature
      rsns       0.0000     163.7106     289.3714     W/m2    net surface SW radiation
      rsds       0.0000     186.2581     355.1668     W/m2    SW down surface
      rsus       0.0000      22.5475     244.4894     W/m2    SW up  surface
      rlns    -156.5469     -50.4704      27.6120     W/m2    net surface LW radiation
      rlds      61.6000     359.6021     499.4793     W/m2    LW down surface
      rlus      81.8297     410.0725     590.0494     W/m2    LW up surface
  net_flux    -937.8983      -4.5828     606.1638     W/m2    surface net energy flux
      rsnt       0.0000     243.1279     391.8030     W/m2    net top SW radiation
      rlnt    -335.0806    -244.8392     -92.6249     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     331.9143     440.1257     W/m2    top incoming SW radiation
      rsut       0.0000      88.7864     266.4878     W/m2    TOA Outgoing SW Radiation
     sclf0    -201.4503     -39.7593       0.0000     W/m2    TOA net SW cloud effect
      tauu   -6486.7368      16.0448   10455.3975    mN/m2    u-stress
      tauv   -3658.6499      15.3631    2562.6169    mN/m2    v-stress
   sfcwind       0.2260       6.6451      22.0135      m/s    10m Wind Speed
       sit       0.0000       0.0352      11.0886        m    ice thickness
      qgvi       0.0000       0.0125       0.3363    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0241       0.5446    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0776       1.1839    kg/m2    total_snow  vertically integrated s