SEPbusy_table.txt Sat Jun 11 16:09:15 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9138     157.4696     mm/d    precip large scale rain
        pr       0.0000       3.1666     157.4696     mm/d    total precipitation
   evspsbl     -18.4492      -3.1360       3.2258     mm/d    evaporation
       P_E     -18.1934       0.0306     155.3183     mm/d    precipitation-evaporation
       sic       0.0000       4.8079      99.9999        %    ice cover (fraction of grid box)
      hfss    -589.0704     -23.1608     602.7202     W/m2    sensible heat flux
      hfls    -605.2595     -90.8224     105.1803     W/m2    latent heat flux
       prw       0.1091      19.8124      46.3582    kg/m2    vertically integrated water vapor
     cllvi       0.0000     117.8862    1450.6658     g/m2    vertically integrated cloud water
     clivi       0.0000       9.7286     119.8023     g/m2    vertically integrated cloud ice
       psl     -33.4812      11.1895      26.2435      hPa    mean sea level pressure
       clt       0.0000      72.8629     100.0000        %    total cloud cover
        ts     -77.3269      13.4275      35.9305        C    surface temperature
       tas     -73.0563      12.5436      33.4787        C    2 m temperature
      rsns       1.1670     157.1946     289.4636     W/m2    net surface SW radiation
      rsds       5.6579     181.8391     344.3134     W/m2    SW down surface
      rsus       2.0290      24.6444     252.3358     W/m2    SW up  surface
      rlns    -165.2866     -49.7734      -0.9411     W/m2    net surface LW radiation
      rlds      62.8086     338.7425     430.5320     W/m2    LW down surface
      rlus      83.3484     388.5160     518.6071     W/m2    LW up surface
  net_flux    -881.9304      -6.5620     332.0581     W/m2    surface net energy flux
      rsnt       3.1617     233.0690     378.8398     W/m2    net top SW radiation
      rlnt    -320.0178    -238.6296     -93.1233     W/m2    net top LW radiation  (-OLR)
      rsdt      10.9002     336.5973     428.4933     W/m2    top incoming SW radiation
      rsut       7.7364     103.5283     259.5649     W/m2    TOA Outgoing SW Radiation
     sclf0    -198.0104     -50.7333       1.1540     W/m2    TOA net SW cloud effect
      tauu   -1634.2230       8.6571    4358.5249    mN/m2    u-stress
      tauv   -3302.7112       4.6050    1671.3789    mN/m2    v-stress
   sfcwind       0.0359       6.2049      22.9718      m/s    10m Wind Speed
       sit       0.0000       0.0716      11.4688        m    ice thickness
      qgvi       0.0000       0.0129       1.0751    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0146       0.5115    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0534       1.7496    kg/m2    total_snow  vertically integrated s