OCTbusy_table.txt Sat Jun 11 18:52:42 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8474     157.2859     mm/d    precip large scale rain
        pr       0.0000       3.1445     157.2859     mm/d    total precipitation
   evspsbl     -14.5910      -3.0983       2.4797     mm/d    evaporation
       P_E     -13.9123       0.0462     156.3882     mm/d    precipitation-evaporation
       sic       0.0000       5.0697     100.0000        %    ice cover (fraction of grid box)
      hfss    -749.4265     -22.0093     447.4968     W/m2    sensible heat flux
      hfls    -478.4513     -89.7820      80.8323     W/m2    latent heat flux
       prw       0.1643      18.5479      43.8852    kg/m2    vertically integrated water vapor
     cllvi       0.0000     111.1128    1405.1980     g/m2    vertically integrated cloud water
     clivi       0.0000       9.9035     153.8040     g/m2    vertically integrated cloud ice
       psl     -28.1609      11.4502      29.4735      hPa    mean sea level pressure
       clt       0.0000      72.1000     100.0000        %    total cloud cover
        ts     -68.4719      12.2834      32.8401        C    surface temperature
       tas     -63.2955      11.3465      29.5014        C    2 m temperature
      rsns       0.0000     160.0026     322.9018     W/m2    net surface SW radiation
      rsds       0.0000     189.3415     394.7851     W/m2    SW down surface
      rsus       0.0000      29.3388     292.8712     W/m2    SW up  surface
      rlns    -173.4096     -50.9772      -0.9692     W/m2    net surface LW radiation
      rlds      70.2461     331.5121     420.6961     W/m2    LW down surface
      rlus     100.0628     382.4893     498.9127     W/m2    LW up surface
  net_flux    -987.3566      -2.7659     324.5268     W/m2    surface net energy flux
      rsnt       0.0000     234.9296     389.7794     W/m2    net top SW radiation
      rlnt    -313.0515    -236.9619    -107.0006     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     342.3935     443.7526     W/m2    top incoming SW radiation
      rsut       0.0000     107.4639     285.4260     W/m2    TOA Outgoing SW Radiation
     sclf0    -202.2056     -50.1380       1.1915     W/m2    TOA net SW cloud effect
      tauu   -1611.0453       6.0060    3429.7473    mN/m2    u-stress
      tauv   -2429.0105       1.2441    1822.4771    mN/m2    v-stress
   sfcwind       0.0335       6.1473      19.5279      m/s    10m Wind Speed
       sit       0.0000       0.0766      11.3901        m    ice thickness
      qgvi       0.0000       0.0132       0.9299    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0141       0.4637    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0536       1.5755    kg/m2    total_snow  vertically integrated s