OCTbusy_table.txt Fri Jun 10 06:53:48 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8980     169.8218     mm/d    precip large scale rain
        pr       0.0000       3.1938     169.8218     mm/d    total precipitation
   evspsbl     -19.9750      -3.1471       2.7771     mm/d    evaporation
       P_E     -16.8502       0.0467     168.6680     mm/d    precipitation-evaporation
       sic       0.0000       4.5873      99.9994        %    ice cover (fraction of grid box)
      hfss    -570.0236     -21.9484     637.2839     W/m2    sensible heat flux
      hfls    -655.3018     -91.1893      90.3276     W/m2    latent heat flux
       prw       0.1142      20.1182      48.7804    kg/m2    vertically integrated water vapor
     cllvi       0.0000     118.5557    1485.7410     g/m2    vertically integrated cloud water
     clivi       0.0000       9.8789     114.6763     g/m2    vertically integrated cloud ice
       psl     -40.7171      11.3343      33.9547      hPa    mean sea level pressure
       clt       0.0000      72.0170     100.0000        %    total cloud cover
        ts     -70.2681      13.2849      33.9091        C    surface temperature
       tas     -65.6180      12.3543      32.6537        C    2 m temperature
      rsns       0.0000     158.6371     304.2056     W/m2    net surface SW radiation
      rsds       0.0000     187.0398     382.4559     W/m2    SW down surface
      rsus       0.0000      28.4026     281.8914     W/m2    SW up  surface
      rlns    -151.6964     -50.3047      -0.1723     W/m2    net surface LW radiation
      rlds      62.4093     337.7464     432.3906     W/m2    LW down surface
      rlus      96.2508     388.0511     505.4529     W/m2    LW up surface
  net_flux    -743.9018      -4.8053     351.6841     W/m2    surface net energy flux
      rsnt       0.0000     234.6076     393.2764     W/m2    net top SW radiation
      rlnt    -315.2457    -239.3864    -102.4833     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     342.3935     443.7526     W/m2    top incoming SW radiation
      rsut       0.0000     107.7859     278.9968     W/m2    TOA Outgoing SW Radiation
     sclf0    -203.3115     -51.3818       1.2944     W/m2    TOA net SW cloud effect
      tauu   -1789.6332      14.6518    4137.1548    mN/m2    u-stress
      tauv   -2735.4114       0.7065    1974.1539    mN/m2    v-stress
   sfcwind       0.0289       6.1164      19.5592      m/s    10m Wind Speed
       sit       0.0000       0.0540      11.6399        m    ice thickness
      qgvi       0.0000       0.0122       0.8884    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0153       0.5697    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0534       1.0936    kg/m2    total_snow  vertically integrated s