NOVbusy_table.txt Sat Jun 11 19:45:29 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8554     150.7030     mm/d    precip large scale rain
        pr       0.0000       3.1886     150.7030     mm/d    total precipitation
   evspsbl     -21.7462      -3.1798       3.6824     mm/d    evaporation
       P_E     -16.1742       0.0088     147.9302     mm/d    precipitation-evaporation
       sic       0.0000       5.3916      99.9999        %    ice cover (fraction of grid box)
      hfss    -532.5380     -20.7133     638.3281     W/m2    sensible heat flux
      hfls    -713.3891     -92.1868     120.0791     W/m2    latent heat flux
       prw       0.1750      17.7832      43.9266    kg/m2    vertically integrated water vapor
     cllvi       0.0000     112.7542    1548.2379     g/m2    vertically integrated cloud water
     clivi       0.0000      10.0443     165.7311     g/m2    vertically integrated cloud ice
       psl     -26.2363      11.6320      35.4465      hPa    mean sea level pressure
       clt       0.0000      72.6299     100.0000        %    total cloud cover
        ts     -51.4330      10.9384      32.2331        C    surface temperature
       tas     -49.3443      10.0242      28.9184        C    2 m temperature
      rsns       0.0000     159.1545     338.7982     W/m2    net surface SW radiation
      rsds       0.0000     192.8879     432.4380     W/m2    SW down surface
      rsus       0.0000      33.7335     313.0343     W/m2    SW up  surface
      rlns    -160.3995     -50.9511       0.1398     W/m2    net surface LW radiation
      rlds      71.7383     325.0621     421.2623     W/m2    LW down surface
      rlus     136.9850     376.0132     494.9325     W/m2    LW up surface
  net_flux    -863.1957      -4.6967     413.4128     W/m2    surface net energy flux
      rsnt       0.0000     234.0313     418.7141     W/m2    net top SW radiation
      rlnt    -309.2234    -234.8933    -133.4555     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     347.7691     481.4131     W/m2    top incoming SW radiation
      rsut       0.0000     113.7378     321.0356     W/m2    TOA Outgoing SW Radiation
     sclf0    -223.0062     -51.8606       2.0872     W/m2    TOA net SW cloud effect
      tauu   -2826.4338      12.2332    5654.1978    mN/m2    u-stress
      tauv   -4146.6514      -1.9901    2949.8176    mN/m2    v-stress
   sfcwind       0.0230       6.2805      20.8479      m/s    10m Wind Speed
       sit       0.0000       0.0827      11.3149        m    ice thickness
      qgvi       0.0000       0.0126       0.7630    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0144       0.4858    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0544       1.8961    kg/m2    total_snow  vertically integrated s