NOVbusy_table.txt Fri Jun 10 06:57:15 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9597     138.3126     mm/d    precip large scale rain
        pr       0.0000       3.2792     141.7407     mm/d    total precipitation
   evspsbl     -24.2956      -3.2653       4.7154     mm/d    evaporation
       P_E     -19.5036       0.0140     140.8897     mm/d    precipitation-evaporation
       sic       0.0000       4.8074      99.9993        %    ice cover (fraction of grid box)
      hfss    -490.1175     -20.5926     792.2844     W/m2    sensible heat flux
      hfls    -796.9483     -94.6485     153.3928     W/m2    latent heat flux
       prw       0.2228      19.3355      47.4062    kg/m2    vertically integrated water vapor
     cllvi       0.0000     116.7082    1612.2697     g/m2    vertically integrated cloud water
     clivi       0.0000      10.0084     156.0992     g/m2    vertically integrated cloud ice
       psl     -32.5513      11.5580      36.5183      hPa    mean sea level pressure
       clt       0.0000      72.0810     100.0000        %    total cloud cover
        ts     -49.5671      12.1498      32.8802        C    surface temperature
       tas     -47.7690      11.2327      30.4096        C    2 m temperature
      rsns       0.0000     158.6425     336.4144     W/m2    net surface SW radiation
      rsds       0.0000     190.9760     437.1763     W/m2    SW down surface
      rsus       0.0000      32.3335     310.5178     W/m2    SW up  surface
      rlns    -163.7733     -50.1295       0.6727     W/m2    net surface LW radiation
      rlds      79.5576     332.0111     434.0636     W/m2    LW down surface
      rlus     141.9194     382.1406     498.9334     W/m2    LW up surface
  net_flux    -931.8444      -6.7282     692.4939     W/m2    surface net energy flux
      rsnt       0.0000     234.6426     426.2538     W/m2    net top SW radiation
      rlnt    -310.3687    -237.6685    -139.4709     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     347.7691     481.4131     W/m2    top incoming SW radiation
      rsut       0.0000     113.1265     320.0974     W/m2    TOA Outgoing SW Radiation
     sclf0    -221.1767     -52.6777       0.8076     W/m2    TOA net SW cloud effect
      tauu   -2592.7622      14.2357    6486.9893    mN/m2    u-stress
      tauv   -3869.1458      -2.2037    3082.5886    mN/m2    v-stress
   sfcwind       0.0209       6.2585      22.9315      m/s    10m Wind Speed
       sit       0.0000       0.0619      11.6332        m    ice thickness
      qgvi       0.0000       0.0124       0.7306    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0155       0.5464    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0552       2.0707    kg/m2    total_snow  vertically integrated s