MAYbusy_table.txt Fri Jun 10 05:56:50 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.1069     230.5444     mm/d    precip large scale rain
        pr       0.0000       3.3661     230.5444     mm/d    total precipitation
   evspsbl     -16.0545      -3.3681       4.0775     mm/d    evaporation
       P_E     -16.0506      -0.0021     228.8391     mm/d    precipitation-evaporation
       sic       0.0000       3.5301     100.0000        %    ice cover (fraction of grid box)
      hfss    -998.7264     -24.8674     480.1607     W/m2    sensible heat flux
      hfls    -464.6896     -97.6334     132.6787     W/m2    latent heat flux
       prw       0.1281      22.2744      53.6762    kg/m2    vertically integrated water vapor
     cllvi       0.0000     118.3309    1351.7742     g/m2    vertically integrated cloud water
     clivi       0.0000      10.2788      95.5901     g/m2    vertically integrated cloud ice
       psl     -30.3568      11.1557      28.0125      hPa    mean sea level pressure
       clt       0.0000      72.4529     100.0000        %    total cloud cover
        ts     -76.4125      15.2188      40.0460        C    surface temperature
       tas     -70.8206      14.2711      37.9617        C    2 m temperature
      rsns       0.0000     154.2171     320.4753     W/m2    net surface SW radiation
      rsds       0.0000     182.1709     404.2130     W/m2    SW down surface
      rsus       0.0000      27.9538     313.4099     W/m2    SW up  surface
      rlns    -153.7684     -48.8948       5.9594     W/m2    net surface LW radiation
      rlds      63.7795     349.1594     447.6275     W/m2    LW down surface
      rlus      84.8972     398.0542     546.9050     W/m2    LW up surface
  net_flux   -1440.5116     -17.1784     547.0460     W/m2    surface net energy flux
      rsnt       0.0000     230.6497     404.9462     W/m2    net top SW radiation
      rlnt    -325.7212    -241.3492     -95.2110     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     332.7651     462.6716     W/m2    top incoming SW radiation
      rsut       0.0000     102.1153     305.4499     W/m2    TOA Outgoing SW Radiation
     sclf0    -203.6557     -46.9251       6.4823     W/m2    TOA net SW cloud effect
      tauu   -2560.0195      12.9658    3404.4265    mN/m2    u-stress
      tauv   -2716.5066       5.6640    1812.5789    mN/m2    v-stress
   sfcwind       0.0305       6.0181      22.8544      m/s    10m Wind Speed
       sit       0.0000       0.0628      10.7759        m    ice thickness
      qgvi       0.0000       0.0134       0.9529    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0168       0.6819    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0549       0.8753    kg/m2    total_snow  vertically integrated s