MARbusy_table.txt Sat Jun 11 15:28:57 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.7936     156.2312     mm/d    precip large scale rain
        pr       0.0000       3.1269     156.2314     mm/d    total precipitation
   evspsbl     -19.4344      -3.1154       2.9174     mm/d    evaporation
       P_E     -16.6402       0.0115     154.2487     mm/d    precipitation-evaporation
       sic       0.0000       4.1869     100.0000        %    ice cover (fraction of grid box)
      hfss    -590.5187     -23.1077     545.6583     W/m2    sensible heat flux
      hfls    -842.4435     -90.3696      94.9318     W/m2    latent heat flux
       prw       0.1601      19.0958      44.1825    kg/m2    vertically integrated water vapor
     cllvi       0.0000     106.7523    1167.2577     g/m2    vertically integrated cloud water
     clivi       0.0000      10.1761     145.6166     g/m2    vertically integrated cloud ice
       psl     -21.4294      11.5848      31.2748      hPa    mean sea level pressure
       clt       2.1505      71.9749     100.0000        %    total cloud cover
        ts     -64.9672      12.0128      32.4292        C    surface temperature
       tas     -61.0926      11.0786      31.0973        C    2 m temperature
      rsns       1.4089     163.5331     293.8964     W/m2    net surface SW radiation
      rsds       8.8798     191.8629     349.9021     W/m2    SW down surface
      rsus       1.7579      28.3297     240.7731     W/m2    SW up  surface
      rlns    -140.2250     -51.1560       0.4298     W/m2    net surface LW radiation
      rlds      69.4783     331.0876     424.2869     W/m2    LW down surface
      rlus     106.6815     382.2436     495.9471     W/m2    LW up surface
  net_flux    -865.4985      -1.1001     713.8011     W/m2    surface net energy flux
      rsnt       7.6428     239.3191     383.3469     W/m2    net top SW radiation
      rlnt    -307.3353    -236.4352    -119.6808     W/m2    net top LW radiation  (-OLR)
      rsdt      21.1779     343.6619     437.0393     W/m2    top incoming SW radiation
      rsut      13.0979     104.3428     278.4480     W/m2    TOA Outgoing SW Radiation
     sclf0    -209.8181     -48.0371       5.0497     W/m2    TOA net SW cloud effect
      tauu   -2089.4182      11.3147    3038.3335    mN/m2    u-stress
      tauv   -2846.8425       0.3821    2052.0735    mN/m2    v-stress
   sfcwind       0.0361       6.0022      22.2765      m/s    10m Wind Speed
       sit       0.0000       0.0777      11.6830        m    ice thickness
      qgvi       0.0000       0.0130       0.8692    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0143       0.5005    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0532       1.8771    kg/m2    total_snow  vertically integrated s