JUNbusy_table.txt Sat Jun 11 15:54:02 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0937     154.0977     mm/d    precip large scale rain
        pr       0.0000       3.3119     154.0999     mm/d    total precipitation
   evspsbl     -18.6589      -3.3471       7.9653     mm/d    evaporation
       P_E     -18.6589      -0.0352     151.5782     mm/d    precipitation-evaporation
       sic       0.0000       4.9253      99.9999        %    ice cover (fraction of grid box)
      hfss    -884.1304     -25.6371     441.8983     W/m2    sensible heat flux
      hfls    -540.0716     -96.9422     230.5505     W/m2    latent heat flux
       prw       0.1205      20.0692      55.5139    kg/m2    vertically integrated water vapor
     cllvi       0.0000     117.3829    1478.3700     g/m2    vertically integrated cloud water
     clivi       0.0000       9.6823     145.1019     g/m2    vertically integrated cloud ice
       psl     -24.9971      11.0843      31.4182      hPa    mean sea level pressure
       clt       0.0000      71.9215     100.0000        %    total cloud cover
        ts     -78.8276      14.2478      38.8582        C    surface temperature
       tas     -72.1940      13.3654      38.0842        C    2 m temperature
      rsns       0.0000     152.8339     330.7051     W/m2    net surface SW radiation
      rsds       0.0000     178.8022     421.5354     W/m2    SW down surface
      rsus       0.0000      25.9682     337.0316     W/m2    SW up  surface
      rlns    -158.0308     -50.6448      12.3569     W/m2    net surface LW radiation
      rlds      63.5542     341.9810     443.5322     W/m2    LW down surface
      rlus      80.8014     392.6258     538.7440     W/m2    LW up surface
  net_flux   -1281.8495     -20.3901     654.9173     W/m2    surface net energy flux
      rsnt       0.0000     228.6083     418.1707     W/m2    net top SW radiation
      rlnt    -335.1417    -240.4516     -91.0528     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     329.7388     517.3927     W/m2    top incoming SW radiation
      rsut       0.0000     101.1305     341.6346     W/m2    TOA Outgoing SW Radiation
     sclf0    -222.0331     -47.7706       3.9256     W/m2    TOA net SW cloud effect
      tauu   -3375.4673       9.3687    3727.5779    mN/m2    u-stress
      tauv   -3158.5818       8.9878    1967.3253    mN/m2    v-stress
   sfcwind       0.0396       6.1209      24.0118      m/s    10m Wind Speed
       sit       0.0000       0.0891      11.5865        m    ice thickness
      qgvi       0.0000       0.0143       1.2513    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0154       0.6144    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0551       1.4093    kg/m2    total_snow  vertically integrated s