JANbusy_table.txt Fri Jun 10 16:24:34 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9059     167.6896     mm/d    precip large scale rain
        pr       0.0000       3.2191     167.6896     mm/d    total precipitation
   evspsbl     -30.6817      -3.2127       6.5520     mm/d    evaporation
       P_E     -30.2886       0.0064     169.8795     mm/d    precipitation-evaporation
       sic       0.0000       4.2454     100.0000        %    ice cover (fraction of grid box)
      hfss    -747.0555     -20.3712    1025.2452     W/m2    sensible heat flux
      hfls   -1006.2889     -93.1381     213.5472     W/m2    latent heat flux
       prw       0.1363      19.0511      49.2311    kg/m2    vertically integrated water vapor
     cllvi       0.0000     115.6913    1529.5253     g/m2    vertically integrated cloud water
     clivi       0.0000       9.7399     109.2824     g/m2    vertically integrated cloud ice
       psl     -25.7853      11.7725      41.0013      hPa    mean sea level pressure
       clt       0.0000      72.9711     100.0000        %    total cloud cover
        ts     -56.2472      10.8754      33.4969        C    surface temperature
       tas     -51.9043       9.9942      31.2845        C    2 m temperature
      rsns       0.0000     160.9341     335.9064     W/m2    net surface SW radiation
      rsds       0.0000     191.3717     427.1158     W/m2    SW down surface
      rsus       0.0000      30.4376     336.9541     W/m2    SW up  surface
      rlns    -152.6201     -49.3955       1.3401     W/m2    net surface LW radiation
      rlds      76.6860     327.3374     428.1137     W/m2    LW down surface
      rlus     127.1568     376.7329     502.6631     W/m2    LW up surface
  net_flux   -1294.5851      -1.9708     744.3419     W/m2    surface net energy flux
      rsnt       0.0000     238.2522     433.9240     W/m2    net top SW radiation
      rlnt    -309.1060    -235.8898    -128.3007     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     351.4519     497.7592     W/m2    top incoming SW radiation
      rsut       0.0000     113.1997     352.1933     W/m2    TOA Outgoing SW Radiation
     sclf0    -230.5180     -54.1387       1.1824     W/m2    TOA net SW cloud effect
      tauu   -3232.7439      11.6505    7066.1416    mN/m2    u-stress
      tauv   -4199.0215      -2.8629    4935.6895    mN/m2    v-stress
   sfcwind       0.0232       6.1814      18.7090      m/s    10m Wind Speed
       sit       0.0000       0.0676      11.7317        m    ice thickness
      qgvi       0.0000       0.0122       0.6252    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0153       0.5762    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0530       1.4667    kg/m2    total_snow  vertically integrated s