FEBbusy_table.txt Fri Jun 10 16:31:59 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8816     135.6695     mm/d    precip large scale rain
        pr       0.0000       3.2035     153.2082     mm/d    total precipitation
   evspsbl     -21.9824      -3.2169       7.2017     mm/d    evaporation
       P_E     -18.4041      -0.0134     152.8760     mm/d    precipitation-evaporation
       sic       0.0000       3.9515     100.0000        %    ice cover (fraction of grid box)
      hfss    -821.8948     -21.8251     734.4775     W/m2    sensible heat flux
      hfls    -636.2684     -93.2629     234.3912     W/m2    latent heat flux
       prw       0.2383      19.1371      48.2852    kg/m2    vertically integrated water vapor
     cllvi       0.0000     110.7019    1459.1376     g/m2    vertically integrated cloud water
     clivi       0.0000       9.7529     133.8175     g/m2    vertically integrated cloud ice
       psl     -23.4277      11.7456      35.1989      hPa    mean sea level pressure
       clt       0.0000      72.8806     100.0000        %    total cloud cover
        ts     -53.6565      11.3647      32.5211        C    surface temperature
       tas     -50.0885      10.4700      30.8710        C    2 m temperature
      rsns       0.0000     163.2737     315.5069     W/m2    net surface SW radiation
      rsds       0.0000     191.6686     393.8229     W/m2    SW down surface
      rsus       0.0000      28.3949     270.3529     W/m2    SW up  surface
      rlns    -152.4500     -50.0846       3.5292     W/m2    net surface LW radiation
      rlds      83.4373     329.0440     427.0736     W/m2    LW down surface
      rlus     131.8534     379.1287     496.2076     W/m2    LW up surface
  net_flux   -1167.0991      -1.8990     758.0422     W/m2    surface net energy flux
      rsnt       0.0000     240.2428     406.7801     W/m2    net top SW radiation
      rlnt    -309.5772    -236.2894    -131.8647     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     348.7498     461.0672     W/m2    top incoming SW radiation
      rsut       0.0000     108.5070     298.1961     W/m2    TOA Outgoing SW Radiation
     sclf0    -225.8627     -51.6705       2.6443     W/m2    TOA net SW cloud effect
      tauu   -2172.1113       9.8597    4447.2402    mN/m2    u-stress
      tauv   -2789.8528      -1.9730    2204.0474    mN/m2    v-stress
   sfcwind       0.0226       6.1546      18.0071      m/s    10m Wind Speed
       sit       0.0000       0.0701      11.7211        m    ice thickness
      qgvi       0.0000       0.0125       0.7800    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0149       0.5426    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0535       2.1226    kg/m2    total_snow  vertically integrated s