AUGbusy_table.txt Sat Jun 11 16:05:39 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0377     172.0302     mm/d    precip large scale rain
        pr       0.0000       3.2662     172.4526     mm/d    total precipitation
   evspsbl     -18.2672      -3.2495       5.8857     mm/d    evaporation
       P_E     -18.2671       0.0166     170.2384     mm/d    precipitation-evaporation
       sic       0.0000       4.7354     100.0000        %    ice cover (fraction of grid box)
      hfss    -895.1343     -24.6616     624.3216     W/m2    sensible heat flux
      hfls    -599.2867     -94.0984     170.3573     W/m2    latent heat flux
       prw       0.1126      20.5266      52.0560    kg/m2    vertically integrated water vapor
     cllvi       0.0000     121.4471    1501.0348     g/m2    vertically integrated cloud water
     clivi       0.0000       9.5951     128.1276     g/m2    vertically integrated cloud ice
       psl     -26.6184      11.0690      27.0217      hPa    mean sea level pressure
       clt       0.0000      72.3581     100.0000        %    total cloud cover
        ts     -79.3645      14.2390      40.4927        C    surface temperature
       tas     -73.0128      13.3387      38.2937        C    2 m temperature
      rsns       0.0000     154.1964     301.0043     W/m2    net surface SW radiation
      rsds       0.0000     177.2060     360.2510     W/m2    SW down surface
      rsus       0.0000      23.0096     270.6814     W/m2    SW up  surface
      rlns    -159.4842     -50.0339      21.4327     W/m2    net surface LW radiation
      rlds      62.5696     342.6645     445.6570     W/m2    LW down surface
      rlus      79.9929     392.6984     550.0076     W/m2    LW up surface
  net_flux   -1291.5037     -14.5975     525.7368     W/m2    surface net energy flux
      rsnt       0.0000     230.5921     391.5873     W/m2    net top SW radiation
      rlnt    -329.9463    -240.4984     -91.3679     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     331.9143     440.1257     W/m2    top incoming SW radiation
      rsut       0.0000     101.3223     280.5068     W/m2    TOA Outgoing SW Radiation
     sclf0    -199.5423     -50.2503       1.1226     W/m2    TOA net SW cloud effect
      tauu   -2186.1655       6.6828    2798.2800    mN/m2    u-stress
      tauv   -2568.7131       8.6318    1664.1914    mN/m2    v-stress
   sfcwind       0.0441       6.1354      24.2079      m/s    10m Wind Speed
       sit       0.0000       0.0721      11.6314        m    ice thickness
      qgvi       0.0000       0.0138       1.0216    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0152       0.4677    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0552       1.5243    kg/m2    total_snow  vertically integrated s