APRbusy_table.txt Thu Jun 09 17:56:56 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0338     222.9725     mm/d    precip large scale rain
        pr       0.0000       3.3315     222.9725     mm/d    total precipitation
   evspsbl     -11.7396      -3.3250       3.6546     mm/d    evaporation
       P_E     -11.1752       0.0065     220.8975     mm/d    precipitation-evaporation
       sic       0.0000       2.9759     100.0000        %    ice cover (fraction of grid box)
      hfss    -917.0334     -23.8077     605.8620     W/m2    sensible heat flux
      hfls    -376.1732     -96.4533     119.0580     W/m2    latent heat flux
       prw       0.1291      22.2782      53.0565    kg/m2    vertically integrated water vapor
     cllvi       0.0000     118.7971    1561.3938     g/m2    vertically integrated cloud water
     clivi       0.0000      10.3923     100.0547     g/m2    vertically integrated cloud ice
       psl     -30.3627      11.3280      28.9662      hPa    mean sea level pressure
       clt       1.0417      72.2711     100.0000        %    total cloud cover
        ts     -72.4964      14.4721      37.8120        C    surface temperature
       tas     -68.1247      13.5402      36.5777        C    2 m temperature
      rsns       0.0000     157.9269     300.5941     W/m2    net surface SW radiation
      rsds       0.0000     186.3011     370.9062     W/m2    SW down surface
      rsus       0.0000      28.3741     283.9651     W/m2    SW up  surface
      rlns    -146.4832     -48.6977      -0.4741     W/m2    net surface LW radiation
      rlds      64.4405     346.0363     438.7951     W/m2    LW down surface
      rlus      91.9073     394.7340     530.9049     W/m2    LW up surface
  net_flux   -1323.2661     -11.0318     433.0020     W/m2    surface net energy flux
      rsnt       0.0000     234.6521     390.0432     W/m2    net top SW radiation
      rlnt    -307.6690    -240.1061    -103.9670     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     337.8088     439.7595     W/m2    top incoming SW radiation
      rsut       0.0000     103.1567     277.7026     W/m2    TOA Outgoing SW Radiation
     sclf0    -196.1298     -47.4905       6.9884     W/m2    TOA net SW cloud effect
      tauu   -1819.6731      11.1716    2970.7153    mN/m2    u-stress
      tauv   -1850.5374       5.1072    1741.9933    mN/m2    v-stress
   sfcwind       0.0389       6.0638      21.2026      m/s    10m Wind Speed
       sit       0.0000       0.0575      11.1711        m    ice thickness
      qgvi       0.0000       0.0132       0.9011    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0167       0.6934    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0531       0.9467    kg/m2    total_snow  vertically integrated s