OCTbusy_table.txt Wed May 18 06:58:27 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9953     184.6441     mm/d    precip large scale rain
        pr       0.0000       3.2620     184.6441     mm/d    total precipitation
   evspsbl     -88.2389      -3.3705      12.9575     mm/d    evaporation
       P_E     -84.8317      -0.1084     182.6849     mm/d    precipitation-evaporation
      hfss    -643.1699     -20.5346     879.9683     W/m2    sensible heat flux
      hfls    -887.6131     -93.0331     102.2597     W/m2    latent heat flux
       prw       0.1213      21.9672      52.5948    kg/m2    vertically integrated water vapor
     cllvi       0.0000      96.9045    1436.2212     g/m2    vertically integrated cloud water
     clivi       0.0000       9.9098     139.7597     g/m2    vertically integrated cloud ice
       clt       0.0000      69.0715     100.0000        %    total cloud cover
        ts     -78.0507      15.0094      39.7642        C    surface temperature
       tas     -71.9476      14.1761      38.5195        C    2 m temperature
      rsns       0.0000     165.5390     312.9374     W/m2    net surface SW radiation
      rsds       0.0000     194.3840     388.0284     W/m2    SW down surface
      rsus       0.0000      28.8450     269.7381     W/m2    SW up  surface
      rlns    -174.6511     -52.3624       3.3077     W/m2    net surface LW radiation
      rlds      63.4716     340.5853     433.5336     W/m2    LW down surface
      rlus      97.2962     392.9477     520.9322     W/m2    LW up surface
  net_flux    -888.0580      -0.3910     417.7578     W/m2    surface net energy flux
      rsnt       0.0000     241.6760     394.9238     W/m2    net top SW radiation
      rlnt    -316.4975    -240.9921    -105.7652     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     342.3895     443.7334     W/m2    top incoming SW radiation
      rsut       0.0000     100.7135     283.6426     W/m2    TOA Outgoing SW Radiation
     sclf0    -212.1518     -47.6548     107.8034     W/m2    TOA net SW cloud effect
      tauu   -2752.5088      12.0853    5674.5737    mN/m2    u-stress
      tauv   -3219.0933       0.5117    2667.4861    mN/m2    v-stress
   sfcwind       0.0317       6.1731      24.4184      m/s    10m Wind Speed
      qgvi       0.0000       0.0131       0.8361    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0170       0.7008    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0510       1.5733    kg/m2    total_snow  vertically integrated s