NOVbusy_table.txt Wed May 18 07:20:52 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9799     277.9344     mm/d    precip large scale rain
        pr       0.0000       3.2833     277.9344     mm/d    total precipitation
   evspsbl     -45.0125      -3.2747       6.2649     mm/d    evaporation
       P_E     -35.5102       0.0087     276.8179     mm/d    precipitation-evaporation
      hfss    -542.8961     -19.1367    1477.3428     W/m2    sensible heat flux
      hfls   -1511.2554     -94.8135     197.3731     W/m2    latent heat flux
       prw       0.1440      21.0083      51.2952    kg/m2    vertically integrated water vapor
     cllvi       0.0000      96.7454    1509.7932     g/m2    vertically integrated cloud water
     clivi       0.0000      10.1654     128.2647     g/m2    vertically integrated cloud ice
       clt       0.0000      69.1363     100.0000        %    total cloud cover
        ts     -53.4771      13.0099      35.9702        C    surface temperature
       tas     -51.5044      12.1489      32.9362        C    2 m temperature
      rsns       0.0000     164.9120     344.8884     W/m2    net surface SW radiation
      rsds       0.0000     198.0485     429.4308     W/m2    SW down surface
      rsus       0.0000      33.1364     323.8463     W/m2    SW up  surface
      rlns    -173.9670     -52.1090       4.9407     W/m2    net surface LW radiation
      rlds      68.0109     334.3555     435.8967     W/m2    LW down surface
      rlus     133.4978     386.4644     518.4437     W/m2    LW up surface
  net_flux    -926.2495      -1.1471     645.1506     W/m2    surface net energy flux
      rsnt       0.0000     240.9458     423.4818     W/m2    net top SW radiation
      rlnt    -314.5072    -238.5043    -130.7902     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     347.7660     481.3849     W/m2    top incoming SW radiation
      rsut       0.0000     106.8202     324.4957     W/m2    TOA Outgoing SW Radiation
     sclf0    -216.2055     -46.4946       4.2691     W/m2    TOA net SW cloud effect
      tauu   -3155.3955      13.6867    9452.4229    mN/m2    u-stress
      tauv   -5255.7310      -1.4783    2887.1475    mN/m2    v-stress
   sfcwind       0.0301       6.2576      24.6502      m/s    10m Wind Speed
      qgvi       0.0000       0.0131       0.8576    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0168       1.0838    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0514       1.5547    kg/m2    total_snow  vertically integrated s