MAYbusy_table.txt Sun May 22 15:32:58 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0132     187.5977     mm/d    precip large scale rain
        pr       0.0000       3.2733     187.5977     mm/d    total precipitation
   evspsbl     -36.2674      -3.4104      25.9240     mm/d    evaporation
       P_E     -32.0244      -0.1371     183.6310     mm/d    precipitation-evaporation
      hfss   -1375.8395     -24.5936     912.8347     W/m2    sensible heat flux
      hfls    -859.8238     -95.4080     126.2098     W/m2    latent heat flux
       prw       0.1390      21.6360      52.8690    kg/m2    vertically integrated water vapor
     cllvi       0.0000      88.2605    1244.7595     g/m2    vertically integrated cloud water
     clivi       0.0000      10.3971      94.9034     g/m2    vertically integrated cloud ice
       psl     -47.2411      11.2600      38.5076      hPa    mean sea level pressure
       clt       0.0000      67.6427     100.0000        %    total cloud cover
        ts     -74.5005      14.1523      39.7773        C    surface temperature
       tas     -69.6519      13.2035      37.5289        C    2 m temperature
      rsns       0.0000     162.4675     332.5531     W/m2    net surface SW radiation
      rsds       0.0000     191.6916     406.5975     W/m2    SW down surface
      rsus       0.0000      29.2241     325.2282     W/m2    SW up  surface
      rlns    -163.8280     -53.9146      10.6821     W/m2    net surface LW radiation
      rlds      64.9055     341.4316     436.8606     W/m2    LW down surface
      rlus      86.9532     395.3462     552.3318     W/m2    LW up surface
  net_flux   -1922.5946     -11.4486     316.6864     W/m2    surface net energy flux
      rsnt       0.0000     237.5233     410.1204     W/m2    net top SW radiation
      rlnt    -329.8443    -240.2179     -98.3170     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     332.7679     462.6536     W/m2    top incoming SW radiation
      rsut       0.0000      95.2446     313.6520     W/m2    TOA Outgoing SW Radiation
     sclf0    -216.7693     -38.8518     140.1662     W/m2    TOA net SW cloud effect
      tauu   -2687.7566       7.6162    6069.4976    mN/m2    u-stress
      tauv   -2851.1875       6.8300    2462.2141    mN/m2    v-stress
   sfcwind       0.0280       6.1311      28.6535      m/s    10m Wind Speed
      qgvi       0.0000       0.0147       1.1445    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0167       0.5937    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0523       0.6586    kg/m2    total_snow  vertically integrated s