MARbusy_table.txt Sat May 21 15:58:31 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8612     241.7998     mm/d    precip large scale rain
        pr       0.0000       3.1821     241.7998     mm/d    total precipitation
   evspsbl     -39.4009      -3.1796       6.3378     mm/d    evaporation
       P_E     -19.1352       0.0025     238.3006     mm/d    precipitation-evaporation
      hfss    -720.9974     -21.9624    1336.1094     W/m2    sensible heat flux
      hfls   -1343.9277     -92.1669     140.1402     W/m2    latent heat flux
       prw       0.1928      21.0903      48.1530    kg/m2    vertically integrated water vapor
     cllvi       0.0000      86.0763    1152.0178     g/m2    vertically integrated cloud water
     clivi       0.0000      10.2788     172.3129     g/m2    vertically integrated cloud ice
       psl     -35.2538      11.4815      33.7889      hPa    mean sea level pressure
       clt       0.0000      67.7762     100.0000        %    total cloud cover
        ts     -63.3017      12.9665      36.2927        C    surface temperature
       tas     -59.5559      12.0550      34.3949        C    2 m temperature
      rsns       1.3828     170.2439     298.9894     W/m2    net surface SW radiation
      rsds       8.8150     198.7555     354.5948     W/m2    SW down surface
      rsus       1.5618      28.5116     268.8321     W/m2    SW up  surface
      rlns    -152.7439     -53.5480      11.0526     W/m2    net surface LW radiation
      rlds      72.0789     334.1190     431.4044     W/m2    LW down surface
      rlus     108.8639     387.6670     523.0403     W/m2    LW up surface
  net_flux   -1099.0988       2.5666     720.2762     W/m2    surface net energy flux
      rsnt       7.7162     246.4320     385.1629     W/m2    net top SW radiation
      rlnt    -316.1595    -238.5996    -119.9582     W/m2    net top LW radiation  (-OLR)
      rsdt      21.1038     343.6659     437.0468     W/m2    top incoming SW radiation
      rsut      13.0581      97.2338     283.3614     W/m2    TOA Outgoing SW Radiation
     sclf0    -210.8104     -41.7045       8.6004     W/m2    TOA net SW cloud effect
      tauu   -2813.2983       9.0027    6582.7651    mN/m2    u-stress
      tauv   -3584.2324      -0.7675    3154.5752    mN/m2    v-stress
   sfcwind       0.0306       6.0234      24.6307      m/s    10m Wind Speed
      qgvi       0.0000       0.0138       1.1439    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0162       0.7467    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0505       1.5745    kg/m2    total_snow  vertically integrated s