FEBbusy_table.txt Sat May 14 14:13:35 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.1313     195.8338     mm/d    precip large scale rain
        pr       0.0000       3.3925     195.8338     mm/d    total precipitation
      hfss    -720.4785     -18.9710    2384.8118     W/m2    sensible heat flux
      hfls   -1806.2810     -98.2056     545.0925     W/m2    latent heat flux
       prw       0.2709      23.8217      60.3778    kg/m2    vertically integrated water vapor
     cllvi       0.0000      99.3301    1339.2815     g/m2    vertically integrated cloud water
     clivi       0.0000       9.9207     105.2034     g/m2    vertically integrated cloud ice
      rsns       0.0000     168.0934     306.3428     W/m2    net surface SW radiation
      rsds       0.0000     194.8183     396.0941     W/m2    SW down surface
      rsus       0.0000      26.7249     279.3669     W/m2    SW up  surface
      rlns    -160.8131     -49.7134      20.3615     W/m2    net surface LW radiation
      rlds      87.0535     341.7708     446.4971     W/m2    LW down surface
      rlus     134.3022     391.4842     532.0667     W/m2    LW up surface
  net_flux    -999.1705       1.2033    1841.1427     W/m2    surface net energy flux
      rsnt       0.0000     247.1148     408.3703     W/m2    net top SW radiation
      rlnt    -314.3511    -241.2450    -139.5215     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     348.6780     460.4554     W/m2    top incoming SW radiation
      rsut       0.0000     101.5632     298.2812     W/m2    TOA Outgoing SW Radiation
      tauu   -3372.2795      11.2759   10590.7188    mN/m2    u-stress
      tauv   -4797.1045      -2.7481    3284.6433    mN/m2    v-stress
   sfcwind       0.0307       6.2042      24.4735      m/s    10m Wind Speed
      qgvi       0.0000       0.0122       0.7800    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0185       0.6473    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0516       0.8740    kg/m2    total_snow  vertically integrated s