DECbusy_table.txt Wed May 18 07:30:52 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9996     167.5665     mm/d    precip large scale rain
        pr       0.0000       3.3231     167.5665     mm/d    total precipitation
   evspsbl     -40.0387      -3.3261       4.4557     mm/d    evaporation
       P_E     -32.0802      -0.0029     164.8317     mm/d    precipitation-evaporation
      hfss    -647.6244     -18.3859    1263.7222     W/m2    sensible heat flux
      hfls   -1316.0831     -96.3543     212.8788     W/m2    latent heat flux
       prw       0.2222      20.9363      53.0073    kg/m2    vertically integrated water vapor
     cllvi       0.0000      99.3279    1930.4976     g/m2    vertically integrated cloud water
     clivi       0.0000       9.8859     141.5561     g/m2    vertically integrated cloud ice
       clt       0.0000      69.9791     100.0000        %    total cloud cover
        ts     -54.5668      12.0725      34.0720        C    surface temperature
       tas     -49.7188      11.2537      31.2657        C    2 m temperature
      rsns       0.0000     164.6079     350.4613     W/m2    net surface SW radiation
      rsds       0.0000     197.8189     476.9128     W/m2    SW down surface
      rsus       0.0000      33.2110     380.3334     W/m2    SW up  surface
      rlns    -171.2552     -51.0300       9.6752     W/m2    net surface LW radiation
      rlds      86.7385     331.2969     434.7955     W/m2    LW down surface
      rlus     129.1586     382.3269     506.9995     W/m2    LW up surface
  net_flux   -1019.9564      -1.1624    1175.5638     W/m2    surface net energy flux
      rsnt       0.0000     241.8980     442.0595     W/m2    net top SW radiation
      rlnt    -306.0501    -237.5412    -132.0655     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     351.1322     549.5040     W/m2    top incoming SW radiation
      rsut       0.0000     109.2343     391.0949     W/m2    TOA Outgoing SW Radiation
     sclf0    -226.5631     -47.9930      10.3211     W/m2    TOA net SW cloud effect
      tauu   -3269.9785      13.0400    7537.0396    mN/m2    u-stress
      tauv   -4367.4849      -3.4574    2915.2688    mN/m2    v-stress
   sfcwind       0.0264       6.3632      21.8976      m/s    10m Wind Speed
      qgvi       0.0000       0.0131       0.6597    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0170       0.6387    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0514       1.2574    kg/m2    total_snow  vertically integrated s