AUGbusy_table.txt Tue May 24 09:33:55 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0793     183.9396     mm/d    precip large scale rain
        pr       0.0000       3.3098     184.6876     mm/d    total precipitation
   evspsbl     -45.3718      -3.4235      23.1031     mm/d    evaporation
       P_E     -45.3718      -0.1137     183.3737     mm/d    precipitation-evaporation
      hfss   -1269.0630     -22.8657    1059.8315     W/m2    sensible heat flux
      hfls   -1040.9248     -95.3286     305.9870     W/m2    latent heat flux
       prw       0.0907      23.3992      60.6513    kg/m2    vertically integrated water vapor
     cllvi       0.0000     105.3934    1640.1608     g/m2    vertically integrated cloud water
     clivi       0.0000       9.5272     203.0186     g/m2    vertically integrated cloud ice
       psl     -51.7937      10.9657      34.1154      hPa    mean sea level pressure
       clt       0.0000      68.3769     100.0000        %    total cloud cover
        ts     -82.9775      15.4823      44.4333        C    surface temperature
       tas     -77.2906      14.6596      43.1849        C    2 m temperature
      rsns       0.0000     159.0768     317.2489     W/m2    net surface SW radiation
      rsds       0.0000     182.2489     377.3045     W/m2    SW down surface
      rsus       0.0000      23.1721     301.5687     W/m2    SW up  surface
      rlns    -169.3920     -51.2679      22.9831     W/m2    net surface LW radiation
      rlds      58.7608     347.9310     453.2388     W/m2    LW down surface
      rlus      76.3469     399.1989     563.1105     W/m2    LW up surface
  net_flux   -1820.5343     -10.3853     817.7938     W/m2    surface net energy flux
      rsnt       0.0000     236.4551     391.6524     W/m2    net top SW radiation
      rlnt    -339.7736    -242.8542     -87.3432     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     331.9118     440.1412     W/m2    top incoming SW radiation
      rsut       0.0000      95.4568     290.8650     W/m2    TOA Outgoing SW Radiation
     sclf0    -211.4888     -44.9763     124.6998     W/m2    TOA net SW cloud effect
      tauu   -3548.8862      11.0221    9113.7168    mN/m2    u-stress
      tauv   -6103.5908       8.8400    2806.8799    mN/m2    v-stress
   sfcwind       0.0301       6.2578      30.1768      m/s    10m Wind Speed
      qgvi       0.0000       0.0137       0.7621    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0174       0.6185    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0505       1.5737    kg/m2    total_snow  vertically integrated s