APRbusy_table.txt Mon May 16 10:51:25 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       3.0307     247.1773     mm/d    precip large scale rain
        pr       0.0000       3.3087     247.1773     mm/d    total precipitation
      hfss   -1040.3135     -22.9617    1552.8020     W/m2    sensible heat flux
      hfls   -1523.0686     -96.3287     127.7049     W/m2    latent heat flux
       prw       0.1530      23.7125      56.5181    kg/m2    vertically integrated water vapor
     cllvi       0.0000      93.9320    1239.5522     g/m2    vertically integrated cloud water
     clivi       0.0001      10.5770      95.3895     g/m2    vertically integrated cloud ice
      rsns       0.0000     164.6127     309.7699     W/m2    net surface SW radiation
      rsds       0.0000     193.5493     371.8952     W/m2    SW down surface
      rsus       0.0000      28.9366     289.7488     W/m2    SW up  surface
      rlns    -157.5085     -51.6114       5.2949     W/m2    net surface LW radiation
      rlds      68.2850     346.3427     449.0079     W/m2    LW down surface
      rlus      92.3977     397.9541     541.5566     W/m2    LW up surface
  net_flux   -1512.3378      -6.2892     665.1779     W/m2    surface net energy flux
      rsnt       0.0000     241.3102     390.4172     W/m2    net top SW radiation
      rlnt    -313.7898    -240.5812    -104.4540     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     337.8126     439.7492     W/m2    top incoming SW radiation
      rsut       0.0000      96.5025     280.7117     W/m2    TOA Outgoing SW Radiation
      tauu   -2949.2773       8.1809    7276.5088    mN/m2    u-stress
      tauv   -3961.8032       1.9963    2190.0161    mN/m2    v-stress
   sfcwind       0.0308       6.0689      25.6637      m/s    10m Wind Speed
      qgvi       0.0000       0.0139       1.2349    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0177       0.7623    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0506       0.9461    kg/m2    total_snow  vertically integrated s