MARbusy_table.txt Tue May 17 08:20:59 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9001     155.1512     mm/d    precip large scale rain
      prls       0.0000       0.2935      94.8653     mm/d    precip large scale snow
      aprl       0.0000       3.1937     155.4963     mm/d    large scale precipitation
        pr       0.0000       3.1937     155.4963     mm/d    total precipitation
   evspsbl     -44.7529      -3.1738       4.2809     mm/d    evaporation
       P_E     -29.0800       0.0198     154.1287     mm/d    precipitation-evaporation
       sic       0.0000       2.8470     100.0000        %    ice cover (fraction of grid box)
      hfss    -709.6672     -21.1201    1608.6569     W/m2    sensible heat flux
      hfls   -1468.0032     -92.0092     139.5498     W/m2    latent heat flux
       prw       0.2102      22.5239      55.3839    kg/m2    vertically integrated water vapor
     cllvi       0.0000      89.0911    1096.5957     g/m2    vertically integrated cloud water
     clivi       0.0000      10.2609      83.9741     g/m2    vertically integrated cloud ice
       psl     -27.0856      11.5223      35.9764      hPa    mean sea level pressure
       clt       1.2097      68.3671     100.0000        %    total cloud cover
        ts     -61.3832      13.7169      35.9583        C    surface temperature
       tas     -58.0182      12.8216      34.9325        C    2 m temperature
      rsns       1.2117     154.2237     282.9976     W/m2    net surface SW radiation
      rsds       8.0162     180.1827     337.3339     W/m2    SW down surface
      rsus       1.4560      25.9591     255.0045     W/m2    SW up  surface
      rlns    -144.6405     -51.9332       9.9810     W/m2    net surface LW radiation
      rlds      79.4258     339.4770     437.6661     W/m2    LW down surface
      rlus     114.2161     391.4102     518.6957     W/m2    LW up surface
  net_flux    -981.6891     -10.8387     824.6698     W/m2    surface net energy flux
      rsnt       7.9930     232.5539     384.1218     W/m2    net top SW radiation
      rlnt    -308.8620    -240.0015    -125.7728     W/m2    net top LW radiation  (-OLR)
      rsdt      21.1038     343.6657     437.0466     W/m2    top incoming SW radiation
      rsut      13.0562     111.1118     297.2657     W/m2    TOA Outgoing SW Radiation
     sclf0    -226.6232     -56.5463       5.6200     W/m2    TOA net SW cloud effect
      tauu   -3277.6560       8.1051    8755.3516    mN/m2    u-stress
      tauv   -4460.2383      -0.6694    3067.7830    mN/m2    v-stress
   sfcwind       0.0288       5.9809      23.1722      m/s    10m Wind Speed
       sit       0.0000       0.0462      11.1032        m    ice thickness
      qgvi       0.0000       0.0131       1.0834    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0167       0.6396    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0507       1.0606    kg/m2    total_snow  vertically integrated s