FEBbusy_table.txt Tue May 17 07:36:01 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.9533     164.6802     mm/d    precip large scale rain
      prls       0.0000       0.2775     112.1416     mm/d    precip large scale snow
      aprl       0.0000       3.2308     164.8042     mm/d    large scale precipitation
        pr       0.0000       3.2308     164.8042     mm/d    total precipitation
   evspsbl     -44.8475      -3.2061      15.9222     mm/d    evaporation
       P_E     -26.3548       0.0247     162.9273     mm/d    precipitation-evaporation
       sic       0.0000       2.6896     100.0000        %    ice cover (fraction of grid box)
      hfss    -644.4851     -18.6731    2258.1411     W/m2    sensible heat flux
      hfls   -1471.5730     -92.9309     518.8858     W/m2    latent heat flux
       prw       0.2127      23.3634      60.4719    kg/m2    vertically integrated water vapor
     cllvi       0.0000      96.5265    1219.8322     g/m2    vertically integrated cloud water
     clivi       0.0000       9.8421     108.7678     g/m2    vertically integrated cloud ice
       psl     -25.5640      11.5811      39.8448      hPa    mean sea level pressure
       clt       0.4310      69.5822     100.0000        %    total cloud cover
        ts     -58.0848      13.3393      37.7039        C    surface temperature
       tas     -50.5506      12.5063      34.7657        C    2 m temperature
      rsns       0.0000     151.8521     306.3177     W/m2    net surface SW radiation
      rsds       0.0000     177.1765     391.2293     W/m2    SW down surface
      rsus       0.0000      25.3244     264.5187     W/m2    SW up  surface
      rlns    -153.3081     -49.9837      22.6598     W/m2    net surface LW radiation
      rlds      87.6942     339.6010     444.2180     W/m2    LW down surface
      rlus     121.5214     389.5847     531.1450     W/m2    LW up surface
  net_flux    -956.7699      -9.7356    1861.2076     W/m2    surface net energy flux
      rsnt       0.0000     232.0926     407.4834     W/m2    net top SW radiation
      rlnt    -310.6292    -240.3382    -134.1127     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     348.6780     460.4554     W/m2    top incoming SW radiation
      rsut       0.0000     116.5855     314.2178     W/m2    TOA Outgoing SW Radiation
     sclf0    -241.7667     -62.2182       3.0292     W/m2    TOA net SW cloud effect
      tauu   -4079.1006      13.7251   10619.7168    mN/m2    u-stress
      tauv   -5421.2939      -4.1734    4964.6655    mN/m2    v-stress
   sfcwind       0.0281       6.0292      25.5606      m/s    10m Wind Speed
       sit       0.0000       0.0374      11.1961        m    ice thickness
      qgvi       0.0000       0.0123       0.7899    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0175       0.7221    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0499       0.8858    kg/m2    total_snow  vertically integrated s