busy_table.txt Thu Apr 21 15:59:23 2022 1

---------------------------------------------------------------------------------------------------
      name          min      fldmean          max     unit    description
---------------------------------------------------------------------------------------------------
      prlr       0.0000       2.8528     198.3859     mm/d    precip large scale rain
      prls       0.0000       0.3182     103.9527     mm/d    precip large scale snow
      aprl       0.0000       3.1710     198.3859     mm/d    large scale precipitation
        pr       0.0000       3.1710     198.3859     mm/d    total precipitation
   evspsbl     -45.0720      -3.1528       5.6524     mm/d    evaporation
       P_E     -23.0705       0.0182     196.3702     mm/d    precipitation-evaporation
       sic       0.0000       3.2834     100.0000        %    ice cover (fraction of grid box)
      hfss    -911.9860     -22.2164    1521.2021     W/m2    sensible heat flux
      hfls   -1478.5406     -91.4471     183.8397     W/m2    latent heat flux
       prw       0.1543      21.9771      51.7099    kg/m2    vertically integrated water vapor
     cllvi       0.0000      89.4695    1167.2115     g/m2    vertically integrated cloud water
     clivi       0.0000      10.5764      86.7812     g/m2    vertically integrated cloud ice
       psl     -29.8196      11.3865      32.2499      hPa    mean sea level pressure
       clt       1.3611      69.1553     100.0000        %    total cloud cover
        ts     -72.5615      14.1334      37.5053        C    surface temperature
       tas     -67.1766      13.2015      35.6373        C    2 m temperature
      rsns       0.0000     150.1399     297.5497     W/m2    net surface SW radiation
      rsds       0.0000     177.3454     372.4885     W/m2    SW down surface
      rsus       0.0000      27.2054     287.6285     W/m2    SW up  surface
      rlns    -156.0142     -52.2414      10.0980     W/m2    net surface LW radiation
      rlds      67.8593     340.5941     435.2913     W/m2    LW down surface
      rlus      91.7978     392.8355     529.1842     W/m2    LW up surface
  net_flux   -1374.6567     -15.7650     917.3507     W/m2    surface net energy flux
      rsnt       0.0000     227.3089     390.8448     W/m2    net top SW radiation
      rlnt    -309.1842    -238.9654    -104.6957     W/m2    net top LW radiation  (-OLR)
      rsdt       0.0000     337.8126     439.7492     W/m2    top incoming SW radiation
      rsut       0.0000     110.5037     282.9358     W/m2    TOA Outgoing SW Radiation
     sclf0    -213.8016     -54.6200       8.0063     W/m2    TOA net SW cloud effect
      tauu   -2543.8772       9.7676    8842.5039    mN/m2    u-stress
      tauv   -5217.9673       3.9986    2336.5530    mN/m2    v-stress
   sfcwind       0.0289       6.1088      27.5206      m/s    10m Wind Speed
       sit       0.0000       0.0591      11.6998        m    ice thickness
      qgvi       0.0000       0.0136       0.8764    kg/m2    total_graupel vertically integrated graupel
      qrvi       0.0000       0.0162       0.5962    kg/m2    total_rain  vertically integrated r
      qsvi       0.0000       0.0512       0.7056    kg/m2    total_snow  vertically integrated s